LIBRARY
DESCRIPTION "Test Interface"
EXPORTS
  TIF_Init
  TR_Init
  SER_Init
  tstsnd_pei_create
  tstrcv_pei_create
  WSAStartup
  tst_drv_write
  TST_Handle
  tst_get_init_time